10 20 30 40 50 60 70 80 90 100 110 120 130 140 150 160 170 Pole number

-0.05

0

0.05

Y dev. from mean (mm)

Top Jaw Pole Tips

0.5 1 1.5 2 2.5 3 3.5 z (m)

Mean: -9.245 mm Slope: +7.474 μrad

10 20 30 40 50 60 70 80 90 100 110 120 130 140 150 160 170 Pole number

-0.1

-0.05

0

0.05

Y dev. from mean (mm)

Bottom Jaw Pole Tips

0.5 1 1.5 2 2.5 3 3.5 z (m)

Mean: -19.295 mm Slope: +22.939 μrad