SLAC Magnetic Measurements Date: 01-13-2015 Time: 16:24:36

Calculate Delta Undulator Fields From Quadrant Measurements

0 20 40 60 80 100 120 140 160 180 200

0.38

0.385

0.39

0.395

0.4

0.405

0.41

0.415

0.42

Quadrant Peak Field Magnitudes, No Ends

Peak Number, No Ends

Abs By Peak (T)

Q1 Q2 Q3 Q4

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

-0.5

-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4

0.5 Q1, Measured Fields And Undulator Fields

Z (m)

Bx By Bx Und By Und

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-0.5

-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4

0.5 Q2, Measured Fields And Undulator Fields

Z (m)

Bx By Bx Und By Und

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

-0.5

-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4

0.5 Q3, Measured Fields And Undulator Fields

Z (m)

Bx By Bx Und By Und

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-0.5

-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4

0.5 Q4, Measured Fields And Undulator Fields

Z (m)

Bx By Bx Und By Und

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

-0.4

-0.3

-0.2

-0.1

0

0.1

0.2

0.3

0.4 Undulator Fields

Z (m)

Bx, By (T)

Bx By