SLAC Magnetic Measurements# Date: 11-29-2020# Time: 11:02:41#

1 1.2 1.4 1.6 1.8 2 2.2 2.4

Z (m) -7 -6 -5 -4 -3 -2 -1 0 1 2 3

Bx, By, Bz (T)

10_{-5} Bench Fields

Bx (T)

By (T)

Bz (T)

14 15 16 17 18 19 20 21 22 Cell Number -6 -5 -4 -3 -2 -1 0 1 2 3

Bx, By (T)

10^{-5} Ave LCLS Tunnel Fields, Pedestals In, No Und

Bx (T) By (T) Bx Bench (T) By Bench (T)

14 15 16 17 18 19 20 21 22

Cell Number -2

-1.5

-1

-0.5

0

0.5

1

1.5

2 dBx, dBy (T)

10_{-5} Diff HXU Tunnel Fields - Bench dBx (T) dBy (T)